From 56593a21209f3ce55fe66d303dbe01b8e081778b Mon Sep 17 00:00:00 2001
From: Patrick Seeger <pseeger@ccwn.org>
Date: Mon, 30 Apr 2012 10:17:02 +0200
Subject: local

---
 index.php                    | 2 +-
 protected/config/maincfg.php | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/index.php b/index.php
index 86c2e05..cf7ae15 100644
--- a/index.php
+++ b/index.php
@@ -1,7 +1,7 @@
 <?php
 
 // change the following paths if necessary
-$yii=dirname(__FILE__).'/../yii/framework/yii.php';
+$yii=dirname(__FILE__).'/../yii-framework/framework/yii.php';
 $config=dirname(__FILE__).'/protected/config/maincfg.php';
 
 // remove the following lines when in production mode
diff --git a/protected/config/maincfg.php b/protected/config/maincfg.php
index 8b37493..879ae7c 100644
--- a/protected/config/maincfg.php
+++ b/protected/config/maincfg.php
@@ -51,7 +51,7 @@ return array(
 		),*/
 		// uncomment the following to use a MySQL database
 		'db'=>array(
-			'connectionString' => 'mysql:host=localhost;dbname=astaf_yii_dev',
+			'connectionString' => 'mysql:host=localhost;dbname=astaf',
 			'emulatePrepare' => true,
 			'username' => 'root',
 			'password' => '',
-- 
cgit v1.0-28-g1787

