From 1a52e642b8bb388fd4c4b29798fa3809a2114c9f Mon Sep 17 00:00:00 2001
From: astaf <astaf@proxy.ccwn.org.ccwn.org>
Date: Tue, 26 Jun 2012 17:10:09 +0200
Subject: Local changes on server

---
 index-test.php                      |  15 ---
 index.php                           |   2 +-
 protected/config/maincfg.php        |  20 ++--
 protected/runtime/application.log   | 186 ++++++++++++++++++++++++++++++++++++
 protected/views/myverein/_view.php  |  46 ---------
 protected/views/myverein/index.php  |  17 ----
 protected/views/myverein/update.php |  15 ---
 protected/views/myverein/view.php   |  25 -----
 8 files changed, 197 insertions(+), 129 deletions(-)
 delete mode 100644 index-test.php
 delete mode 100644 protected/views/myverein/_view.php
 delete mode 100644 protected/views/myverein/index.php
 delete mode 100644 protected/views/myverein/update.php
 delete mode 100644 protected/views/myverein/view.php

diff --git a/index-test.php b/index-test.php
deleted file mode 100644
index 8947767..0000000
--- a/index-test.php
+++ /dev/null
@@ -1,15 +0,0 @@
-<?php
-/**
- * This is the bootstrap file for test application.
- * This file should be removed when the application is deployed for production.
- */
-
-// change the following paths if necessary
-$yii=dirname(__FILE__).'/../yii/framework/yii.php';
-$config=dirname(__FILE__).'/protected/config/test.php';
-
-// remove the following line when in production mode
-defined('YII_DEBUG') or define('YII_DEBUG',true);
-
-require_once($yii);
-Yii::createWebApplication($config)->run();
diff --git a/index.php b/index.php
index 86c2e05..cf7ae15 100644
--- a/index.php
+++ b/index.php
@@ -1,7 +1,7 @@
 <?php
 
 // change the following paths if necessary
-$yii=dirname(__FILE__).'/../yii/framework/yii.php';
+$yii=dirname(__FILE__).'/../yii-framework/framework/yii.php';
 $config=dirname(__FILE__).'/protected/config/maincfg.php';
 
 // remove the following lines when in production mode
diff --git a/protected/config/maincfg.php b/protected/config/maincfg.php
index 124cd3c..52c34bf 100644
--- a/protected/config/maincfg.php
+++ b/protected/config/maincfg.php
@@ -55,7 +55,7 @@ return array(
                 'transportType' => 'php',
                 'viewPath' => 'application.views.mail',
                 'logging' => true,
-                'dryRun' => true
+                'dryRun' => false
         ),
 		// uncomment the following to enable URLs in path-format
 		
@@ -73,12 +73,13 @@ return array(
 		),*/
 		// uncomment the following to use a MySQL database
 		'db'=>array(
-			'connectionString' => 'mysql:host=localhost;dbname=astaf',
-			'emulatePrepare' => true,
-			'username' => 'astaf',
-			'password' => 'AsTaF4',
-			'charset' => 'utf8',
-		),
+                        'connectionString' => 'mysql:host=database;dbname=astaf_2012',
+                        'emulatePrepare' => true,
+                        'username' => 'astaf',
+                        'password' => 'AsTaF4',
+                        'charset' => 'utf8',
+                        'tablePrefix' => 'tbl_'
+                ),
 		'errorHandler'=>array(
 			// use 'site/error' action to display errors
             'errorAction'=>'site/error',
@@ -95,10 +96,9 @@ return array(
 					'logFile'=>'debug.log',
 				),
 				// uncomment the following to show log messages on web pages
-				/*
 				array(
 					'class'=>'CWebLogRoute',
-				),*/
+				),
 			),
 		),
 	),
@@ -119,4 +119,4 @@ return array(
 		'logo_width'=>50,
 		'logo_height'=>50,
 	),
-);
\ No newline at end of file
+);
diff --git a/protected/runtime/application.log b/protected/runtime/application.log
index 80c7626..a3235c9 100644
--- a/protected/runtime/application.log
+++ b/protected/runtime/application.log
@@ -6809,3 +6809,189 @@ Stack trace:
 REQUEST_URI=/admin.astaf.de/index.php?r=user/newPassword
 HTTP_REFERER=http://dev.astaf.de:90/admin.astaf.de/index.php?r=user/admin
 ---
+2012/06/14 22:22:48 [error] [exception.CException] exception 'CException' with message 'CAssetManager.basePath "/home/astaf/2012/admin.astaf.de/assets" ist ungültig. Bitte stellen Sie sicher, dass das Verzeichnis existiert und der Webserver-Prozess Schreibrechte dafür besitzt.' in /home/astaf/2012/yii-framework/framework/web/CAssetManager.php:116
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/web/CAssetManager.php(101): CAssetManager->setBasePath('/home/astaf/201...')
+#1 /home/astaf/2012/yii-framework/framework/web/CAssetManager.php(219): CAssetManager->getBasePath()
+#2 /home/astaf/2012/yii-framework/framework/web/CClientScript.php(449): CAssetManager->publish('/home/astaf/201...')
+#3 /home/astaf/2012/yii-framework/framework/web/CClientScript.php(486): CClientScript->getCoreScriptUrl()
+#4 /home/astaf/2012/yii-framework/framework/web/CClientScript.php(302): CClientScript->getPackageBaseUrl('jquery')
+#5 /home/astaf/2012/yii-framework/framework/web/CClientScript.php(195): CClientScript->renderCoreScripts()
+#6 /home/astaf/2012/yii-framework/framework/web/CController.php(352): CClientScript->render('<!DOCTYPE html>...')
+#7 /home/astaf/2012/yii-framework/framework/web/CController.php(789): CController->processOutput('<!DOCTYPE html>...')
+#8 /home/astaf/2012/admin.astaf.de/protected/controllers/SiteController.php(93): CController->render('login', Array)
+#9 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): SiteController->actionLogin()
+#10 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#11 /home/astaf/2012/yii-framework/framework/web/CController.php(287): CController->runAction(Object(CInlineAction))
+#12 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#13 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('login')
+#14 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('site/login')
+#15 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#16 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#17 {main}
+REQUEST_URI=/index.php?r=site/login
+---
+2012/06/14 22:23:32 [error] [exception.CDbException] exception 'CDbException' with message 'CDbConnection konnte keine DB-Verbindung herstellen: SQLSTATE[HY000] [2002] Can't connect to local MySQL server through socket '/var/run/mysqld/mysqld.sock' (2)' in /home/astaf/2012/yii-framework/framework/db/CDbConnection.php:382
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/db/CDbConnection.php(331): CDbConnection->open()
+#1 /home/astaf/2012/yii-framework/framework/db/CDbConnection.php(309): CDbConnection->setActive(true)
+#2 /home/astaf/2012/yii-framework/framework/base/CModule.php(388): CDbConnection->init()
+#3 /home/astaf/2012/yii-framework/framework/base/CApplication.php(431): CModule->getComponent('db')
+#4 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(615): CApplication->getDb()
+#5 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(2263): CActiveRecord->getDbConnection()
+#6 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(379): CActiveRecordMetaData->__construct(Object(User))
+#7 /home/astaf/2012/admin.astaf.de/protected/models/User.php(31): CActiveRecord::model('User')
+#8 /home/astaf/2012/admin.astaf.de/protected/components/UserIdentity.php(16): User::model()
+#9 /home/astaf/2012/admin.astaf.de/protected/models/LoginForm.php(52): UserIdentity->authenticate()
+#10 /home/astaf/2012/yii-framework/framework/validators/CInlineValidator.php(43): LoginForm->authenticate('password', Array)
+#11 /home/astaf/2012/yii-framework/framework/validators/CValidator.php(197): CInlineValidator->validateAttribute(Object(LoginForm), 'password')
+#12 /home/astaf/2012/yii-framework/framework/base/CModel.php(158): CValidator->validate(Object(LoginForm), NULL)
+#13 /home/astaf/2012/admin.astaf.de/protected/controllers/SiteController.php(89): CModel->validate()
+#14 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): SiteController->actionLogin()
+#15 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#16 /home/astaf/2012/yii-framework/framework/web/CController.php(287): CController->runAction(Object(CInlineAction))
+#17 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#18 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('login')
+#19 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('site/login')
+#20 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#21 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#22 {main}
+REQUEST_URI=/index.php?r=site/login
+HTTP_REFERER=http://admin.astaf.de/index.php?r=site/login
+---
+2012/06/22 10:48:04 [error] [exception.CException] exception 'CException' with message 'Eigenschaft "User.admin_pw_reset ist nicht definiert.' in /home/astaf/2012/yii-framework/framework/base/CComponent.php:131
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(144): CComponent->__get('admin_pw_reset')
+#1 /home/astaf/2012/yii-framework/framework/validators/CNumberValidator.php(79): CActiveRecord->__get('admin_pw_reset')
+#2 /home/astaf/2012/yii-framework/framework/validators/CValidator.php(197): CNumberValidator->validateAttribute(Object(User), 'admin_pw_reset')
+#3 /home/astaf/2012/yii-framework/framework/base/CModel.php(158): CValidator->validate(Object(User), NULL)
+#4 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(786): CModel->validate(NULL)
+#5 /home/astaf/2012/admin.astaf.de/protected/components/UserIdentity.php(35): CActiveRecord->save()
+#6 /home/astaf/2012/admin.astaf.de/protected/models/LoginForm.php(52): UserIdentity->authenticate()
+#7 /home/astaf/2012/yii-framework/framework/validators/CInlineValidator.php(43): LoginForm->authenticate('password', Array)
+#8 /home/astaf/2012/yii-framework/framework/validators/CValidator.php(197): CInlineValidator->validateAttribute(Object(LoginForm), 'password')
+#9 /home/astaf/2012/yii-framework/framework/base/CModel.php(158): CValidator->validate(Object(LoginForm), NULL)
+#10 /home/astaf/2012/admin.astaf.de/protected/controllers/SiteController.php(89): CModel->validate()
+#11 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): SiteController->actionLogin()
+#12 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#13 /home/astaf/2012/yii-framework/framework/web/CController.php(287): CController->runAction(Object(CInlineAction))
+#14 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#15 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('login')
+#16 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('site/login')
+#17 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#18 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#19 {main}
+REQUEST_URI=/index.php?r=site/login
+HTTP_REFERER=http://admin.astaf.de/index.php?r=site/login
+---
+2012/06/22 10:49:13 [error] [exception.CException] exception 'CException' with message 'Eigenschaft "User.admin_pw_reset ist nicht definiert.' in /home/astaf/2012/yii-framework/framework/base/CComponent.php:131
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(144): CComponent->__get('admin_pw_reset')
+#1 /home/astaf/2012/yii-framework/framework/validators/CNumberValidator.php(79): CActiveRecord->__get('admin_pw_reset')
+#2 /home/astaf/2012/yii-framework/framework/validators/CValidator.php(197): CNumberValidator->validateAttribute(Object(User), 'admin_pw_reset')
+#3 /home/astaf/2012/yii-framework/framework/base/CModel.php(158): CValidator->validate(Object(User), NULL)
+#4 /home/astaf/2012/yii-framework/framework/db/ar/CActiveRecord.php(786): CModel->validate(NULL)
+#5 /home/astaf/2012/admin.astaf.de/protected/components/UserIdentity.php(35): CActiveRecord->save()
+#6 /home/astaf/2012/admin.astaf.de/protected/models/LoginForm.php(52): UserIdentity->authenticate()
+#7 /home/astaf/2012/yii-framework/framework/validators/CInlineValidator.php(43): LoginForm->authenticate('password', Array)
+#8 /home/astaf/2012/yii-framework/framework/validators/CValidator.php(197): CInlineValidator->validateAttribute(Object(LoginForm), 'password')
+#9 /home/astaf/2012/yii-framework/framework/base/CModel.php(158): CValidator->validate(Object(LoginForm), NULL)
+#10 /home/astaf/2012/admin.astaf.de/protected/controllers/SiteController.php(89): CModel->validate()
+#11 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): SiteController->actionLogin()
+#12 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#13 /home/astaf/2012/yii-framework/framework/web/CController.php(287): CController->runAction(Object(CInlineAction))
+#14 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#15 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('login')
+#16 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('site/login')
+#17 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#18 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#19 {main}
+REQUEST_URI=/index.php?r=site/login
+HTTP_REFERER=http://admin.astaf.de/index.php?r=site/login
+---
+2012/06/25 10:58:53 [error] [exception.CException] exception 'CException' with message 'MyvereinController kann den angeforderten View "view" nicht finden.' in /home/astaf/2012/yii-framework/framework/web/CController.php:879
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/web/CController.php(783): CController->renderPartial('view', Array, true)
+#1 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(51): CController->render('view', Array)
+#2 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(102): MyvereinController->actionView()
+#3 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): MyvereinController->actionIndex()
+#4 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#5 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(134): CController->runAction(Object(CInlineAction))
+#6 /home/astaf/2012/yii-framework/framework/web/filters/CFilter.php(41): CFilterChain->run()
+#7 /home/astaf/2012/yii-framework/framework/web/CController.php(1146): CFilter->filter(Object(CFilterChain))
+#8 /home/astaf/2012/yii-framework/framework/web/filters/CInlineFilter.php(59): CController->filterAccessControl(Object(CFilterChain))
+#9 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(131): CInlineFilter->filter(Object(CFilterChain))
+#10 /home/astaf/2012/yii-framework/framework/web/CController.php(292): CFilterChain->run()
+#11 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#12 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('')
+#13 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('myVerein')
+#14 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#15 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#16 {main}
+REQUEST_URI=/index.php?r=myVerein
+HTTP_REFERER=http://vereine.astaf.de/index.php?r=site/login
+---
+2012/06/25 10:58:59 [error] [exception.CException] exception 'CException' with message 'MyvereinController kann den angeforderten View "view" nicht finden.' in /home/astaf/2012/yii-framework/framework/web/CController.php:879
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/web/CController.php(783): CController->renderPartial('view', Array, true)
+#1 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(51): CController->render('view', Array)
+#2 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(102): MyvereinController->actionView()
+#3 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): MyvereinController->actionIndex()
+#4 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#5 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(134): CController->runAction(Object(CInlineAction))
+#6 /home/astaf/2012/yii-framework/framework/web/filters/CFilter.php(41): CFilterChain->run()
+#7 /home/astaf/2012/yii-framework/framework/web/CController.php(1146): CFilter->filter(Object(CFilterChain))
+#8 /home/astaf/2012/yii-framework/framework/web/filters/CInlineFilter.php(59): CController->filterAccessControl(Object(CFilterChain))
+#9 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(131): CInlineFilter->filter(Object(CFilterChain))
+#10 /home/astaf/2012/yii-framework/framework/web/CController.php(292): CFilterChain->run()
+#11 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#12 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('')
+#13 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('myVerein')
+#14 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#15 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#16 {main}
+REQUEST_URI=/index.php?r=myVerein
+---
+2012/06/25 15:38:12 [error] [exception.CException] exception 'CException' with message 'MyvereinController kann den angeforderten View "view" nicht finden.' in /home/astaf/2012/yii-framework/framework/web/CController.php:879
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/web/CController.php(783): CController->renderPartial('view', Array, true)
+#1 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(51): CController->render('view', Array)
+#2 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(102): MyvereinController->actionView()
+#3 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): MyvereinController->actionIndex()
+#4 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#5 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(134): CController->runAction(Object(CInlineAction))
+#6 /home/astaf/2012/yii-framework/framework/web/filters/CFilter.php(41): CFilterChain->run()
+#7 /home/astaf/2012/yii-framework/framework/web/CController.php(1146): CFilter->filter(Object(CFilterChain))
+#8 /home/astaf/2012/yii-framework/framework/web/filters/CInlineFilter.php(59): CController->filterAccessControl(Object(CFilterChain))
+#9 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(131): CInlineFilter->filter(Object(CFilterChain))
+#10 /home/astaf/2012/yii-framework/framework/web/CController.php(292): CFilterChain->run()
+#11 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#12 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('')
+#13 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('myVerein')
+#14 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#15 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#16 {main}
+REQUEST_URI=/index.php?r=myVerein
+HTTP_REFERER=http://vereine.astaf.de/index.php?r=site/login
+---
+2012/06/25 15:38:32 [error] [exception.CException] exception 'CException' with message 'MyvereinController kann den angeforderten View "view" nicht finden.' in /home/astaf/2012/yii-framework/framework/web/CController.php:879
+Stack trace:
+#0 /home/astaf/2012/yii-framework/framework/web/CController.php(783): CController->renderPartial('view', Array, true)
+#1 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(51): CController->render('view', Array)
+#2 /home/astaf/2012/admin.astaf.de/protected/controllers/MyVereinController.php(102): MyvereinController->actionView()
+#3 /home/astaf/2012/yii-framework/framework/web/actions/CInlineAction.php(50): MyvereinController->actionIndex()
+#4 /home/astaf/2012/yii-framework/framework/web/CController.php(309): CInlineAction->runWithParams(Array)
+#5 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(134): CController->runAction(Object(CInlineAction))
+#6 /home/astaf/2012/yii-framework/framework/web/filters/CFilter.php(41): CFilterChain->run()
+#7 /home/astaf/2012/yii-framework/framework/web/CController.php(1146): CFilter->filter(Object(CFilterChain))
+#8 /home/astaf/2012/yii-framework/framework/web/filters/CInlineFilter.php(59): CController->filterAccessControl(Object(CFilterChain))
+#9 /home/astaf/2012/yii-framework/framework/web/filters/CFilterChain.php(131): CInlineFilter->filter(Object(CFilterChain))
+#10 /home/astaf/2012/yii-framework/framework/web/CController.php(292): CFilterChain->run()
+#11 /home/astaf/2012/yii-framework/framework/web/CController.php(266): CController->runActionWithFilters(Object(CInlineAction), Array)
+#12 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(276): CController->run('')
+#13 /home/astaf/2012/yii-framework/framework/web/CWebApplication.php(135): CWebApplication->runController('myVerein')
+#14 /home/astaf/2012/yii-framework/framework/base/CApplication.php(162): CWebApplication->processRequest()
+#15 /home/astaf/2012/admin.astaf.de/index.php(13): CApplication->run()
+#16 {main}
+REQUEST_URI=/index.php?r=myVerein
+---
diff --git a/protected/views/myverein/_view.php b/protected/views/myverein/_view.php
deleted file mode 100644
index fe5758c..0000000
--- a/protected/views/myverein/_view.php
+++ /dev/null
@@ -1,46 +0,0 @@
-<div class="view">
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('id')); ?>:</b>
-	<?php echo CHtml::link(CHtml::encode($data->id), array('view', 'id'=>$data->id)); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('name')); ?>:</b>
-	<?php echo CHtml::encode($data->name); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('url')); ?>:</b>
-	<?php echo CHtml::encode($data->url); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('bild')); ?>:</b>
-	<?php echo CHtml::encode($data->bild); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('email')); ?>:</b>
-	<?php echo CHtml::encode($data->email); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('slug')); ?>:</b>
-	<?php echo CHtml::encode($data->slug); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('kontaktdaten')); ?>:</b>
-	<?php echo CHtml::encode($data->kontaktdaten); ?>
-	<br />
-
-	<?php /*
-	<b><?php echo CHtml::encode($data->getAttributeLabel('beschreibung')); ?>:</b>
-	<?php echo CHtml::encode($data->beschreibung); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('standort_id')); ?>:</b>
-	<?php echo CHtml::encode($data->standort_id); ?>
-	<br />
-
-	<b><?php echo CHtml::encode($data->getAttributeLabel('published')); ?>:</b>
-	<?php echo CHtml::encode($data->published); ?>
-	<br />
-
-	*/ ?>
-
-</div>
\ No newline at end of file
diff --git a/protected/views/myverein/index.php b/protected/views/myverein/index.php
deleted file mode 100644
index 640dfa1..0000000
--- a/protected/views/myverein/index.php
+++ /dev/null
@@ -1,17 +0,0 @@
-<?php
-$this->breadcrumbs=array(
-	'Vereins',
-);
-
-$this->menu=array(
-	array('label'=>'Create Verein', 'url'=>array('create')),
-	array('label'=>'Manage Verein', 'url'=>array('admin')),
-);
-?>
-
-<h1>Vereins</h1>
-
-<?php $this->widget('zii.widgets.CListView', array(
-	'dataProvider'=>$dataProvider,
-	'itemView'=>'_view',
-)); ?>
diff --git a/protected/views/myverein/update.php b/protected/views/myverein/update.php
deleted file mode 100644
index bd1476c..0000000
--- a/protected/views/myverein/update.php
+++ /dev/null
@@ -1,15 +0,0 @@
-<?php
-$this->breadcrumbs=array(
-	'Mein Verein'=>array('index'),
-	$model->name=>array('view'),
-	'Bearbeiten',
-);
-
-$this->menu=array(
-	array('label'=>'Anzeigen', 'url'=>array('view'))
-);
-?>
-
-<h1>Meinen Verein aktualisieren</h1>
-
-<?php echo $this->renderPartial('/verein/_form', array('model'=>$model)); ?>
\ No newline at end of file
diff --git a/protected/views/myverein/view.php b/protected/views/myverein/view.php
deleted file mode 100644
index 52afea7..0000000
--- a/protected/views/myverein/view.php
+++ /dev/null
@@ -1,25 +0,0 @@
-<?php
-$this->breadcrumbs=array(
-	'Mein Verein'=>array('index'),
-	$model->name,
-);
-
-$this->menu=array(
-	array('label'=>'Bearbeiten', 'url'=>array('update'))
-);
-?>
-
-<h1>Mein Verein</h1>
-
-<?php $this->widget('zii.widgets.CDetailView', array(
-	'data'=>$model,
-	'attributes'=>array(
-		'name',
-		array('label'=>'Homepage', 'value'=>CHtml::link($model->url, $model->url, array("target"=>"_blank")), 'type'=>'raw'),
-		array('label'=>'Bild', 'value'=>CHtml::image($model->bild), 'type'=>'raw'),
-		'email',
-		'kontaktdaten:html',
-		'beschreibung:html',
-		array('label'=>'Standort', 'value'=>($model->standort) ? $model->standort->name : "-")
-	),
-)); ?>
-- 
cgit v1.0-28-g1787

